E_{max}^{COMPUTER}

SYSTEMS, INC.

480 TWEEDSMUIR AVE.

OTTAWA, ONTARIO CANADA K1Z 5N9 (613) 725-3198

2013/11/18

Quote No. 13001 To: Gordon Rothman Gatewave, Inc. 244 5th Avenue Suite G201 New York, NY 10001

Price Quotation

Terms: Net 10 FOB: Ottawa, Ont. Ship Via:Internet

Item Part# Description Qty. Unit Pr. Extn.

Server Setup / Web-site hosting 1 Setup 1 5,000 5,000

One-time charge Install and configure 2 servers, each:

Dell PowerEdge C6100 1 x Quad Core 2.26GHz (Intel L5530) 8GB DDR3 1,333MHz 2 x 1 TB Hard Drives w/RAID 1

2 Host 12 250 3,000

Monthly hosting charges Includes:

10 Mbps Bandwidth per server 50 concurrent streaming audio clients (Icecast) ftp server web-site hosting System Administration 24/7 on-site technical support

8,000

This quote is valid for 60 days from date of quotation.