Dr Gerd Schneider 474 Holland Avenue, Ottawa, ON K1Y 0Z5

                                      February 26, 2009

To Whom it may concern:

  I have been the physician of the Friedman family for over 20
years and have personal knowledge that Aidel Friedman lived with
her mother, Mrs. Deborah Friedman, in Ottawa at 480 Tweedsmuir
Avenue, for the period of March 1997 until the present.

                                      Sincerely yours,

                                      Dr Gerd Schneider